         180           8
   3.11762626311696        2.38763791016395        1.60472005804767     
  0.868818215445556       0.189412568257213      -0.544406246403435     
  -1.24338343979047       -2.05052151010611     
 -0.657595327705707      -0.849466864782776       -1.10166547816439     
  -1.27245386828097       -1.30195425974751       -1.38593182683111     
  -1.55592973818750       -1.71897712759307     
 -7.987045589824444E-003  0.000000000000000E+000
   1.01008396482861       0.000000000000000E+000
   1.01452016476424       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
