         180           8
  -1.28470374771080       -1.88439912825276       -2.44922408334444     
  -3.06896946289205       -3.82574542864235       -4.61912500308020     
  -5.41285042664613       -5.44257284862262     
 -0.423217918265540      -0.390814327973400      -0.451828814192777     
 -0.527324344733877      -0.539516287223922      -0.707503353446334     
  -1.15180706586264       -1.47510488880877     
 -8.029447976670301E-003  0.000000000000000E+000
   1.00983196832459       0.000000000000000E+000
   1.01370988441130       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
