         180           8
   4.88319838018108        4.25862040147631        3.57170968215731     
   2.89004761451997        2.09411784668254        1.27195750426357     
  0.500628165239419      -0.138250797022009     
  -1.82175895756762       -1.79375190101838       -1.88983346233640     
  -1.99493671307526       -2.06955291534261       -2.22310838375723     
  -2.54179564558947       -2.67231914751672     
 -7.847183139360657E-003  0.000000000000000E+000
   1.01015756353392       0.000000000000000E+000
   1.01365488185193       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
