         180           8
   2.76902289438862        2.10460296811805        1.40936601175495     
  0.697406258195071      -4.966256274923100E-002 -0.657862237185004     
  -1.22844534828887       -1.78919954661866     
  -1.14501884918809       -1.17173231421773       -1.34648297751002     
  -1.55077796180545       -1.72617305061446       -1.94065119368964     
  -2.14176565667586       -2.23534726345841     
 -7.973076755683395E-003  0.000000000000000E+000
   1.01012151293420       0.000000000000000E+000
   1.01385548711560       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
