         180           8
   2.52396349386647        1.75380363163620        1.03343206789020     
  0.367555836420253      -0.371244353561317       -1.13692223988518     
  -1.81157649951650       -2.42759152640570     
 -0.822546761998931       -1.10540959445589       -1.25037398114908     
  -1.38634820596258       -1.47841101175203       -1.56009534437369     
  -1.77404189825843       -2.04142141755304     
 -8.046352600015936E-003  0.000000000000000E+000
   1.01025945722658       0.000000000000000E+000
   1.01394566698436       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
