         180           8
  0.241194630655949       8.728120549102487E-002 -0.159500247448623     
 -0.477966921363737      -0.653672658107383      -0.711525414138475     
 -0.843398002440628       -1.16435096326566     
  -2.61477567902191       -2.25785696390254       -1.83644699153542     
  -1.48870882162493       -1.12783505318777      -0.860055645519075     
 -0.706771731782197      -0.569957844384785     
 -7.958309786588376E-003  0.000000000000000E+000
   1.00953769694414       0.000000000000000E+000
   1.01322600295629       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
