         180           8
 -0.935074646054694       -1.06562298260880       -1.14920128921853     
  -1.39609344621162       -1.68432492352295       -1.89671644639402     
  -2.14747693433204       -1.92709895906719     
  -3.11973244173641       -2.79165406732181       -2.46371335772620     
  -2.25570844006563       -1.99616299069904       -1.88586790389072     
  -1.73637939396823       -1.32350934871462     
 -7.826377111893495E-003  0.000000000000000E+000
   1.00951116837917       0.000000000000000E+000
   1.01365655168326       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
