         180           8
 -0.342433486744505      -0.268961337523702      -0.455368872195345     
 -0.907538174771559       -1.14523464681353      -0.983445535638273     
 -0.945386513467754       -1.27390738781840     
  -3.07795441609934       -2.94818074982199       -2.62619075144568     
  -2.46245194767333       -2.36320762916418       -2.02086795059491     
  -1.59261654342091       -1.34431866760609     
 -7.848759197819275E-003  0.000000000000000E+000
   1.00946267830406       0.000000000000000E+000
   1.01344447358038       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
