         180           8
 -0.565217087178036      -0.708777033026439      -0.725345140556737     
 -0.857655831305075       -1.01925552069801       -1.22924573179924     
  -1.45952410359046       -1.60534992625624     
  -2.81316038771413       -2.81972714712025       -2.37905162270678     
  -1.92270169483800       -1.58740402115324       -1.28605199359346     
  -1.01565784204309      -0.810386328105235     
 -8.038109294760416E-003  0.000000000000000E+000
   1.00940240270745       0.000000000000000E+000
   1.01294590919653       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
