         180           8
 -0.484606664255884      -0.704085944014211      -0.945483709246755     
  -1.11878092247000       -1.20567209487740       -1.32997623742960     
  -1.44685117604185       -1.65359539329305     
  -8.71495219416209       -8.63654473528741       -8.43684541523881     
  -8.18007306069576       -7.87262864623490       -7.62895191662668     
  -7.45166549291240       -7.21701133008650     
 -8.761585712110526E-003  0.000000000000000E+000
   1.00905393748262       0.000000000000000E+000
   1.01306693356137       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
