         180           3
   5.14455156760020        6.80932984771741        8.32700113390602     
  -7.46898832196150       -6.74311256061165       -5.34692602036116     
  1.111743758076591E-003  0.000000000000000E+000
  0.986961038038012       0.000000000000000E+000
  0.984467314649740       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
