         180           8
  -1.01929951417483       -1.19056974878310       -1.38429539329276     
  -1.50200038032749       -1.65562704800266       -1.85799985895696     
  -1.90795963817652       -1.96047562341557     
  -8.72764505963041       -8.52245009460166       -8.28618256106265     
  -8.04554369304497       -7.86692459057909       -7.67382068377778     
  -7.40310997140595       -7.03358616994152     
 -8.736745955582489E-003  0.000000000000000E+000
   1.00963910525682       0.000000000000000E+000
   1.01319436590455       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
