         180           8
   1.60547599877988       0.923915588332992       0.312126778419027     
 -0.287477503015081      -0.870886667638009       -1.42752998842751     
  -1.99208078108424       -2.37493124986402     
  -6.86650188966298       -7.00254922154267       -7.14409659935486     
  -7.39055526645336       -7.66396139319646       -7.88989057957158     
  -8.13195562890372       -8.41813689206673     
 -9.476143960502625E-003  0.000000000000000E+000
   1.01044550203756       0.000000000000000E+000
   1.01450276931473       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
