         180           8
  -7.38259309777866       -7.89167761303541       -8.63819217606409     
  -9.17529629222314       -9.50003163623589       -10.0469961128797     
  -10.3425119863050       -10.3736826198195     
  -5.48376053269712       -6.47329570976001       -6.99776121547574     
  -7.19694240502846       -7.36260955201429       -7.37233793729188     
  -7.44321828467363       -7.42684722519752     
 -9.162322592022838E-003  0.000000000000000E+000
   1.00931866263936       0.000000000000000E+000
   1.01341762022721       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
