         180           8
   1.76406573673816        1.52786156634568        1.32012520147521     
   1.19378901465622       0.978110381925260       0.816417519326150     
  0.658806786113687       0.509728526496549     
  -10.7010074637477       -10.5203029043560       -10.3054891638626     
  -10.0571774073794       -9.78182750538545       -9.46566490437723     
  -9.08495053791476       -8.75893431422446     
 -8.891326164100566E-003  0.000000000000000E+000
   1.00963502071273       0.000000000000000E+000
   1.01389665102444       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
