         180           8
  0.767930438214611       0.551492947647422       0.412546954181765     
  0.232552601747797       7.630619304439346E-002 -8.145069533023834E-002
 -0.173050931201836      -0.415758490703649     
  -10.3891590437004       -10.3367788350476       -10.0929545712723     
  -9.83137451926038       -9.56974148863677       -9.31093457886313     
  -8.99612094011839       -8.60196603457145     
 -8.951420692021785E-003  0.000000000000000E+000
   1.00956508248707       0.000000000000000E+000
   1.01412502820492       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
