         180           3
   4.83288399000975        6.48993752042740        8.14043273071012     
  -10.4322100335365       -9.72116480866181       -8.44512002243625     
  1.458431913909480E-003  0.000000000000000E+000
  0.987347638507322       0.000000000000000E+000
  0.984564443952925       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
