         180           8
   2.74347629991090        2.56396432354347        2.35591879902082     
   2.24148332675639        2.07855809663646        1.91829551160991     
   1.78152714438688        1.63461553538315     
  -10.3271571121825       -10.3351797585376       -10.0822960131917     
  -9.81680385825733       -9.68665578913817       -9.49518803673968     
  -9.20063223597867       -8.77059382515647     
 -8.890161363992732E-003  0.000000000000000E+000
   1.00961465716431       0.000000000000000E+000
   1.01406819792912       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
