         180           8
   15.5686600595850        14.8800874001187        14.3356024461905     
   13.7233332458172        13.1108653299389        12.5209984220126     
   11.9807271837689        11.4049822910380     
  -5.88656280072613       -6.12693755410530       -6.25447197370483     
  -6.38005760004176       -6.45956176622257       -6.51827840051481     
  -6.58313253446066       -6.71115731316301     
 -7.991510683284832E-003  0.000000000000000E+000
   1.01082729776437       0.000000000000000E+000
   1.01501957982767       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
