         180           8
   23.1822986607121        22.4673847630333        21.7912092417424     
   21.0045254289052        20.2822231701655        19.5960398575825     
   18.8514219147139        18.3145446537926     
  -6.88139073243309       -6.94303647762410       -7.01356701401697     
  -7.07717147978361       -7.20101310200710       -7.31095158185265     
  -7.48962819511897       -7.59422403833882     
 -7.479332226583133E-003  0.000000000000000E+000
   1.01013845025768       0.000000000000000E+000
   1.01400818038209       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
