         180           8
   30.7409446148518        30.0174658888094        29.3026329331695     
   28.5786889054107        27.8506460293273        27.0451283990985     
   26.2461330912993        25.5043908356107     
  -7.74603993564662       -7.90321945208763       -7.95554962270791     
  -8.06396543133190       -8.21332237623452       -8.23645353964304     
  -8.22062122866283       -8.09283313988826     
  3.105011743043937E-003  0.000000000000000E+000
  0.987965108255618       0.000000000000000E+000
  0.985257550938222       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
