         180           8
   18.1870144971046        17.3941998920565        16.7029785138648     
   16.0137071757289        15.3677413524598        14.7396394543651     
   14.1277600001806        13.6485848032979     
  -6.11659760653045       -6.22140838187902       -6.26311092331043     
  -6.34867045167023       -6.49776021970492       -6.70862284917504     
  -6.88952525778175       -6.90410721344264     
 -7.458126461929712E-003  0.000000000000000E+000
   1.00998040291467       0.000000000000000E+000
   1.01383435085886       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
