         180           8
   23.2774595113357        22.7160494062686        22.0092960618434     
   21.2841551873538        20.5409521877722        19.8985297156679     
   19.2206585689366        18.6039088538492     
  -6.43291093404188       -6.57876501411642       -6.67340284742493     
  -6.80527257673837       -6.91185656632146       -6.99380242949270     
  -7.03398122739014       -7.26877687253336     
 -7.235947600672980E-003  0.000000000000000E+000
   1.01030694583741       0.000000000000000E+000
   1.01428737604991       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
