         180           8
   30.0873996862324        29.5463687422135        29.0290704820122     
   28.2650826355666        27.7469745698334        28.4798847435421     
   28.9873794473256        28.4383823797272     
  -6.99679271182627       -7.47645063672649       -7.85574635982447     
  -8.24268305058780       -8.77732024379190       -9.83180849668439     
  -10.5860473945250       -10.6582643221490     
  3.401902631381894E-003  0.000000000000000E+000
  0.987906335489108       0.000000000000000E+000
  0.986198338485867       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
