         180           3
   25.2133806499731        22.3062426441658        20.1781173955180     
  -7.22534268053462       -7.28943600097294       -7.66538625460604     
  2.385810969187565E-003  0.000000000000000E+000
  0.988031746556071       0.000000000000000E+000
  0.985566812194085       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
