         180           8
   13.1307911740641        12.9862961476744        12.7518863177165     
   12.6206906259150        12.4175750102764        12.2293955697173     
   12.0486738635187        12.1641962719664     
  -7.12736826708468       -6.91757028361092       -6.77799092098441     
  -6.63922393763381       -6.48294115364815       -6.27011147599377     
  -5.93532146113092       -5.63491167045144     
 -7.628772671619787E-003  0.000000000000000E+000
   1.00986133628564       0.000000000000000E+000
   1.01397590700037       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
