         180           3
   19.1811407837818        21.0709332301632        22.6782969108736     
  -7.04143634767125       -6.89722695221489       -5.92819942903361     
  2.344145356468387E-003  0.000000000000000E+000
  0.987880701146393       0.000000000000000E+000
  0.984932365050432       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
