         180           3
   19.2019785413439        20.5089965373803        22.0789850495147     
  -8.57257960830570       -7.23203798228803       -6.07863367887467     
  2.363593208970268E-003  0.000000000000000E+000
  0.988464405635928       0.000000000000000E+000
  0.985852048253482       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
