         180           8
   14.8417330192041        14.4905010637552        14.2355143712970     
   14.0684582987489        13.9012724621574        13.6525974001947     
   13.4324558906287        13.2020913093793     
  -6.48647203702662       -6.27704000133624       -6.06453152709223     
  -5.88231624939128       -5.66162141281205       -5.46487103584036     
  -5.30646744762060       -5.26289756526739     
 -7.619173919928470E-003  0.000000000000000E+000
   1.01025983713913       0.000000000000000E+000
   1.01410327992380       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
