         180           3
   18.6069952893237        20.2578256287804        21.9004503651334     
  -6.09049985207753       -5.36893243775209       -4.52379733921556     
  2.115596741307647E-003  0.000000000000000E+000
  0.987870298190149       0.000000000000000E+000
  0.985262361711339       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
