         180           8
   14.8333321710304        14.4264323522203        14.1620728154630     
   13.9447106815760        13.6383228427914        13.5178806886152     
   13.4981132337067        13.3468388988756     
  -6.46953226910239       -6.25936685932318       -6.06286178289808     
  -5.90300295129858       -5.75718327208366       -5.54201435040860     
  -5.21691032900513       -4.94726416597128     
 -7.669719481751159E-003  0.000000000000000E+000
   1.01013610288174       0.000000000000000E+000
   1.01394933772338       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
