         180           8
   18.8759717061912        18.1497928143255        17.4415957996534     
   16.6698609169812        15.8963777171345        15.1965366591621     
   14.4088100863879        13.7307907703757     
  -7.21439939232846       -7.45329539718620       -7.55845360809142     
  -7.70311869319676       -7.86823109916028       -8.03386627368900     
  -8.19071684536090       -8.39064846819489     
 -7.979123236429258E-003  0.000000000000000E+000
   1.01140504944619       0.000000000000000E+000
   1.01529908138519       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
