         180           3
   25.2870241771604        22.4643703823009        20.5000574390069     
  -5.31456965888210       -5.45935364667028       -5.35321088939075     
  2.384368359734045E-003  0.000000000000000E+000
  0.988022945873801       0.000000000000000E+000
  0.985224433345579       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
