         180           8
   22.8794839093442        22.0136544470688        21.1389506161040     
   20.3749337982654        19.6383065855055        18.8056709598422     
   18.0098993224354        17.3482310979986     
  -7.15664189368826       -6.70763668926260       -7.59819227880983     
  -7.85347800558494       -8.10029407332467       -8.35157033574969     
  -8.48393775549669       -8.69851050628103     
 -7.983498657490526E-003  0.000000000000000E+000
   1.01130182064968       0.000000000000000E+000
   1.01486412504006       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
