         180           3
   27.3157473738002        24.5766899195414        21.8329009612427     
  -6.80875422356749       -9.02802113641697       -9.40875903604679     
  3.045720054713181E-003  0.000000000000000E+000
  0.988066998566914       0.000000000000000E+000
  0.985343857194682       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
