         180           8
   18.7660409897436        17.9883423522145        17.2421041323249     
   16.5308386300567        15.8548072172436        15.0410584015186     
   14.3165588005821        13.3860514698293     
  -7.55870679515637       -7.57017125657686       -7.68461171886297     
  -7.82015964214929       -7.98426067182349       -8.13922031478636     
  -8.27725920245643       -8.39586501767381     
 -8.049744479182630E-003  0.000000000000000E+000
   1.01093353376533       0.000000000000000E+000
   1.01439260969368       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
