         180           3
   25.7085800034984        22.9983147431715        20.5581823872427     
  -7.42689460532689       -7.71122806282424       -7.77400562909028     
  2.709402186630929E-003  0.000000000000000E+000
  0.987693110597000       0.000000000000000E+000
  0.985149204590014       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
