         180           8
   18.3427487280038        17.4927838647338        16.7373016763983     
   16.0477199284515        15.3105893987427        14.5503338846948     
   13.8113856318763        13.1370744283334     
  -7.08668532753234       -7.12700780548359       -7.23524631568436     
  -7.32829821143938       -7.47654029425284       -7.64466536833877     
  -7.81819576612828       -7.90904495643962     
 -7.985053540746079E-003  0.000000000000000E+000
   1.01072090260750       0.000000000000000E+000
   1.01444121090818       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
