         180           8
   17.0888419124010        16.7733727283358        16.5296099135263     
   16.3481947640104        16.1941372880816        15.9605808125424     
   15.8046217843622        15.6513056359764     
  -8.63600865034439       -8.52783987512528       -8.32392879905573     
  -8.18073429474638       -8.03208237498808       -7.81570509683259     
  -7.54901493534639       -7.26034510401071     
 -7.661136603207201E-003  0.000000000000000E+000
   1.01024062821256       0.000000000000000E+000
   1.01395098530009       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
