         180           3
   26.7244856909630        28.0025915872392        29.3503785292159     
  -37.2632510958943       -36.2864876427124       -35.0810733816275     
  2.413645341619264E-003  0.000000000000000E+000
  0.987879883300478       0.000000000000000E+000
  0.985093585675941       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
