         180           8
   21.3999503774780        21.1913712600008        20.9671272770861     
   20.7190568032622        20.5038734137976        20.3178686265761     
   20.1732793345006        19.9526388008167     
  -33.8517969197907       -33.7532909758300       -33.5558335231569     
  -33.3510761011602       -33.1065258083766       -32.7744803127623     
  -32.4035295126938       -32.0310399245260     
 -8.656340418319839E-003  0.000000000000000E+000
   1.01005082337051       0.000000000000000E+000
   1.01457602737233       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
