         180           3
   24.9392410668192        26.3647693993568        28.0298919046954     
  -35.7342862062115       -35.2783977494816       -33.7699461783955     
  2.015808669563037E-003  0.000000000000000E+000
  0.987443605361618       0.000000000000000E+000
  0.984581971921489       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
