         180           8
   16.7249979387043        16.5628782171898        16.3453496960895     
   16.1392453617625        15.9608665350226        15.8236203782355     
   15.6125755196045        15.4306054222927     
  -32.8073019007715       -32.6131751659670       -32.3511954446768     
  -32.0821684247088       -31.7873936181457       -31.4661816327998     
  -31.1541343147082       -30.8358368193973     
 -8.639497628735469E-003  0.000000000000000E+000
   1.00950079504534       0.000000000000000E+000
   1.01459028178734       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
