         180           3
   23.2634059160392        24.9401449205677        26.3824953551944     
  -33.2335717268933       -32.4115314639579       -30.8724785112261     
  1.583250151750590E-003  0.000000000000000E+000
  0.987456411192424       0.000000000000000E+000
  0.984644914200292       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
