         180           8
   19.0452076558111        18.2850288111736        17.5454596509695     
   16.7732273216506        15.9702991471503        15.2457709544886     
   14.5651028893854        13.9510584191769     
  -29.4219821490832       -29.4625066928946       -29.5219218180682     
  -29.6775367340993       -29.8925515559033       -30.1437619048026     
  -30.3744987172040       -30.2952634677834     
 -8.619676948450665E-003  0.000000000000000E+000
   1.00909819204226       0.000000000000000E+000
   1.01329167970464       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
