         180           3
   29.3042121547233        26.0199422131207        23.5002427001791     
  -29.6381609171893       -29.5501261891366       -29.6263069385755     
  1.616289436180039E-003  0.000000000000000E+000
  0.987107886644178       0.000000000000000E+000
  0.984419893935646       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
