         180           8
   19.7673716303638        18.9185432986427        18.1465298111528     
   17.3770753701016        16.5636137682717        15.7222382243790     
   14.9934743255560        14.1621057313563     
  -28.7465177360632       -28.9623148568013       -29.1600422705056     
  -29.2462261008051       -29.3486183399062       -29.5203721139371     
  -29.7408147537023       -29.8447689450368     
 -8.698101726674087E-003  0.000000000000000E+000
   1.00945229117466       0.000000000000000E+000
   1.01390124476280       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
