         180           3
   28.1545523867766        24.9701106615892        21.6011117646488     
  -28.6173470592240       -28.9647239484293       -28.6668652710579     
  1.714291185267532E-003  0.000000000000000E+000
  0.986971215486766       0.000000000000000E+000
  0.984235307115010       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
