         180           8
   21.7028673420375        20.9604510949898        20.2392484652560     
   19.4498497700660        18.6468535269231        17.8450771398073     
   17.0844394377856        16.2687324269524     
  -29.9750581937594       -30.0106687775894       -30.1164146368531     
  -30.2203331337802       -30.3734678680944       -30.5496413330392     
  -30.7583051067311       -30.9922559079012     
 -8.982314549657325E-003  0.000000000000000E+000
   1.00992245153675       0.000000000000000E+000
   1.01434845034915       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
