         180           8
   18.8158672637021        18.2503910645648        17.4795964550140     
   16.7149521655137        15.8912687180724        15.1082778087995     
   14.4481843755969        13.7258030624871     
  -29.4998663325285       -29.6474533308166       -29.7393905916623     
  -29.9056934849441       -30.0788481894656       -30.2121675145351     
  -30.3883893636702       -30.4102464959458     
 -9.024627246490035E-003  0.000000000000000E+000
   1.00986006285425       0.000000000000000E+000
   1.01407884754646       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
